-7 -6 -5 -4 -3 -2 -1 0 1 2 3 4 5 6 7 8

/data/seasonalclims/scimdjf7993.dic

Addition of ERA monthly means tapv Time average for djf7993: Potential vorticity pvu 02/03/98 13:52:43 Mean 0.237925 Max 6.27629 Min -5.82082 theta 315 Kelvin

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90