210 217 224 231 238 245 252 259 266 273 280 287 294 301 308 315

/data/seasonalclims/scphdjf7993.dic

Addition of ERA monthly means t2m Time average for djf7993: Temperature at 2m K 02/03/98 14:09:46 Mean 285.046 Max 304.745 Min 221.928

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90