180 190 200 210 220 230 240 250 260 270 280 290 300 310 320 330

/data/seasonalclims/scphjja7993.dic

Addition of ERA monthly means t2m Time average for jja7993: Temperature at 2m K 02/03/98 18:21:54 Mean 288.904 Max 310.682 Min 198.618

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90