200 208 216 224 232 240 248 256 264 272 280 288 296 304 312 320

/data/seasonalclims/scphmam7993.dic

Addition of ERA monthly means t2m Time average for mam7993: Temperature at 2m K 02/04/98 16:24:23 Mean 286.917 Max 305.027 Min 207.459

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90