210 217 224 231 238 245 252 259 266 273 280 287 294 301 308 315

/data/seasonalclims/scphson7993.dic

Addition of ERA monthly means t2m Time average for son7993: Temperature at 2m K 02/04/98 19:49:52 Mean 287.157 Max 305.488 Min 211.486

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90