-56 -52 -48 -44 -40 -36 -32 -28 -24 -20 -16 -12 -8 -4 0 4

/data/dp04/dp04apr79.dic

UGAMP IFS ERA(I) T107L17 ta Temperature K 02/09/98 17:05:02

Mean -15.2595 Max -1.48019 Min -50.1645 pressure 500 hPa time 91 days

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90