-2 0 2 4 6 8 10 12 14 16 18 20 22 24 26 28

/data/dp06/dp06apr79.dic

UGAMP IFS ERA(I) T107L17 hus Specific humidity g kg-1 02/09/98 17:05:29

Mean 6.14412 Max 24.7994 Min -1.03303 pressure 850 hPa time 91 days

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90