-360

-330

-300

-270

-240

-210

-180

-150

-120 -90 -60 -30 0 30 60 90

/data/seasonalclims/scfcdjf7993.dic

Addition of ERA monthly means sfclheat Time average for djf7993: Surface latent heat flux Wm-2 02/03/98 14:03:44 Mean -80.3586 Max 7.76746 Min -319.575

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90