11

/data/seasonalclims/scphdjf7993.dic

Addition of ERA monthly means u10m Time average for djf7993: Zonal wind at 10m m/s 02/03/98 14:09:40 Mean -0.208007 Max 9.0071 Min -8.3377

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90