17

/data/seasonalclims/scpmdjf7993.dic

Addition of ERA monthly means tau Time average for djf7993: Zonal wind ms-1 02/03/98 12:59:12 Mean 1.20888 Max 15.6596 Min -9.58924 pressure 850 hPa

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90