4700

4800

4900

5000

5100

5200

5300

5400

5500

5600

5700

5800

5900

6000

6100

6200

/data/dp05/dp05apr79.dic

UGAMP IFS ERA(I) T107L17 zg Geopotential height m 02/09/98 17:05:14

Mean 5648.3 Max 5920.62 Min 4801.4 pressure 500 hPa time 91 days

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90