840 900 960 1020

1080

1140

1200

1260

1320

1380

1440

1500

1560

1620

1680

1740

/data/dp05/dp05apr79.dic

UGAMP IFS ERA(I) T107L17 zg Geopotential height m 02/09/98 17:05:14

Mean 1451.92 Max 1658.25 Min 887.922 pressure 850 hPa time 91 days

-180 -150 -120 -90 -60 -30 0 30 60 90 120 150 180 -90

-70

-50

-30

-10

10

30

50

70

90