Seasonal Net Radiation at the Top of the Atmosphere (eadvl) units=W m^(-2)

time (years) 2017 2019 2021 2023 2025 2027

2007 2009 2011 2013 2015

-7.5

-2.5

5.0 2.5

10.0

-5.0

7.5

0.0