Annual (12 month running mean) Global Mean Surface Temperature (eadze) units=K

time (years) 1984 1985 1986 1987 1988

1979 1980 1981 1982 1983

286.5

286.8 286.7 286.6

286.1

286.2

286.3

286.4

285.9

286.9

286.0

287.0