Nino-3 Sea Surface Temperature Anomaly (eafeb) units=(degrees centigrade)

time (years) 2000 2020 2040

-4.5

-3.5

0.0

3.0 4.0

-2.5

1.0 2.0

0.5 -0.5

1.5

3.5

-1.0

2.5

-5.0

-4.0

-3.0

-2.0

-1.5