Seasonal Net Radiation at the Top of the Atmosphere (eafie) units=W m^(-2)

time (years) 2016 2020 2024

2004 2008 2012

0 1 2 3 4 5 6 7 8 9 10

-1

-8 -7 -6 -5 -4 -3 -2