Annual (12 month running mean) Global Mean Surface Temperature (xblek) units=K

time (years) 2048 2049 2050 2051 2052 2053 2054

2046 2047

285.64 285.60 285.56 285.52 285.48 285.44 285.40 285.36

285.68