Winter (DJFM) SLP diff. Lisbon minus Iceland (NAO)(xbyla) units=(hPa)/10

time (years) 1979 1980 1981

2.5 2.6

2.0

2.4

2.7

2.2 2.1

2.9

1.8

2.3

1.9

2.8