Maximum Salinity (Ocean) (xbylp) units=(PSU-35)/1000

time (years) 1979.5 1980.5

1979.0 1980.0

0.0072

0.0092 0.0088

0.0068

0.0076

0.0080

0.0064 0.0060 0.0056

0.0084

0.0096