Total Sea Ice Area: Northern Hemisphere (xciel) units=km**2

time (years) 2020

2000 2040

1980

1.0E7

1.4E7

1.6E7

1.8E7

2.0E7

1.2E7

0.2E7

0.4E7

0.8E7 0.6E7