Annual (12 month running mean) Global Mean SST (xciel) units=(degrees centigrade)

time (years) 2020

2000 2040

1980

17.5

17.3

17.7

17.1

18.1

17.2

16.7

17.6

17.0

18.0

16.8

17.8

17.4

16.9

17.9