NAO index: normalised (DJFM) SLP diff. Lisbon - Iceland(eacsb) units=(hPa)

time (years) 1984 1988 1992 1996 2000

1980

2.19

2.20

2.14

2.21

2.15

2.22

2.16

2.17

2.18