NAO index: normalised (DJFM) SLP diff. Lisbon - Iceland(eafeb) units=(hPa)

time (years) 2000 2020 2040

1.88

1.85

1.82

1.79

1.89

1.86

1.83

1.80

1.87

1.84

1.81