NAO index: normalised (DJFM) SLP diff. Lisbon - Iceland(eafie) units=(hPa)

time (years) 2016 2020 2024 2028

2004 2008 2012

1.69

1.66

1.63

1.70

1.67

1.64

1.68

1.65

1.62